X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a660d684eda27638bca0384b2058911a31c8e845..7b28757f5e64bac68d9b159240616fc4d9ad66bc:/docs/latex/wx/validatr.tex?ds=sidebyside

diff --git a/docs/latex/wx/validatr.tex b/docs/latex/wx/validatr.tex
index c5c13bf4d2..cb23b95288 100644
--- a/docs/latex/wx/validatr.tex
+++ b/docs/latex/wx/validatr.tex
@@ -18,14 +18,25 @@ To specify a default, `null' validator, use the symbol {\bf wxDefaultValidator}.
 
 For more information, please see \helpref{Validator overview}{validatoroverview}.
 
+\pythonnote{If you wish to create a validator class in wxPython you should
+derive the class from {\tt wxPyValidator} in order to get Python-aware
+capabilities for the various virtual methods.}
+
 \wxheading{Derived from}
 
 \helpref{wxEvtHandler}{wxevthandler}\\
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/validate.h>
+
 \wxheading{See also}
 
-\helpref{Validator overview}{validatoroverview}, \helpref{wxTextValidator}{wxtextvalidator}
+\helpref{Validator overview}{validatoroverview},
+\helpref{wxTextValidator}{wxtextvalidator},
+\helpref{wxGenericValidator}{wxgenericvalidator},
+
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
@@ -60,6 +71,13 @@ This base function returns NULL.
 
 Returns the window associated with the validator.
 
+\membersection{wxValidator::SetBellOnError}{wxvalidatorsetbellonerror}
+
+\func{void}{SetBellOnError}{\param{bool}{ doIt = TRUE}}
+
+This functions switches on or turns off the error sound produced by the
+validators if an invalid key is pressed.
+
 \membersection{wxValidator::SetWindow}\label{wxvalidatorsetwindow}
 
 \func{void}{SetWindow}{\param{wxWindow*}{ window}}
@@ -68,14 +86,14 @@ Associates a window with the validator.
 
 \membersection{wxValidator::TransferFromWindow}\label{wxvalidatortransferfromwindow}
 
-\func{virtual bool}{TransferToWindow}{\param{wxWindow*}{ parent}}
+\func{virtual bool}{TransferToWindow}{}
 
 This overridable function is called when the value in the window must be
 transferred to the validator. Return FALSE if there is a problem.
 
 \membersection{wxValidator::TransferToWindow}\label{wxvalidatortransfertowindow}
 
-\func{virtual bool}{TransferToWindow}{\param{wxWindow*}{ parent}}
+\func{virtual bool}{TransferToWindow}{}
 
 This overridable function is called when the value associated with the validator must be
 transferred to the window. Return FALSE if there is a problem.
