X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a660d684eda27638bca0384b2058911a31c8e845..7b1279006496ba3251a755bcef91301ad107bb78:/docs/latex/wx/settings.tex?ds=inline

diff --git a/docs/latex/wx/settings.tex b/docs/latex/wx/settings.tex
index c85151e9b6..b2a772318f 100644
--- a/docs/latex/wx/settings.tex
+++ b/docs/latex/wx/settings.tex
@@ -8,6 +8,10 @@ and user interface element sizes.
 
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/settings.h>
+
 \wxheading{See also}
 
 \helpref{wxFont}{wxfont}, \helpref{wxColour}{wxcolour}
@@ -21,9 +25,9 @@ and user interface element sizes.
 Default constructor. You don't need to create an instance of wxSystemSettings
 since all of its functions are static.
 
-\membersection{wxSystemSettings::GetSystemColour}\label{wxsystemsettingsgetsystemcolour}
+\membersection{wxSystemSettings::GetColour}\label{wxsystemsettingsgetcolour}
 
-\func{static wxColour}{GetSystemColour}{\param{int}{ index}}
+\func{static wxColour}{GetColour}{\param{wxSystemColour}{ index}}
 
 Returns a system colour.
 
@@ -64,9 +68,12 @@ Returns a system colour.
 \twocolitem{{\bf wxSYS\_COLOUR\_BTNHILIGHT}}{Same as wxSYS\_COLOUR\_BTNHIGHLIGHT.}
 \end{twocollist}
 
-\membersection{wxSystemSettings::GetSystemFont}\label{wxsystemsettingsgetsystemfont}
+\pythonnote{This static method is implemented in Python as a
+standalone function named {\tt wxSystemSettings\_GetColour}}
+
+\membersection{wxSystemSettings::GetFont}\label{wxsystemsettingsgetfont}
 
-\func{static wxFont}{GetSystemFont}{\param{int}{ index}}
+\func{static wxFont}{GetFont}{\param{wxSystemFont}{ index}}
 
 Returns a system font.
 
@@ -83,9 +90,12 @@ Returns a system font.
 Not available in versions of Windows earlier than Windows 95 or Windows NT 4.0.}
 \end{twocollist}
 
-\membersection{wxSystemSettings::GetSystemMetric}\label{wxsystemsettingsgetsystemmetric}
+\pythonnote{This static method is implemented in Python as a
+standalone function named {\tt wxSystemSettings\_GetFont}}
 
-\func{static int}{GetSystemMetric}{\param{int}{ index}}
+\membersection{wxSystemSettings::GetMetric}\label{wxsystemsettingsgetmetric}
+
+\func{static int}{GetMetric}{\param{wxSystemMetric}{ index}}
 
 Returns a system metric.
 
@@ -139,3 +149,6 @@ where it would otherwise present the information only in audible form; zero othe
 \twocolitem{{\bf wxSYS\_SWAP\_BUTTONS}}{Non-zero if the meanings of the left and right mouse buttons are swapped; zero otherwise.}
 \end{twocollist}
 
+\pythonnote{This static method is implemented in Python as a
+standalone function named {\tt wxSystemSettings\_GetMetric}}
+
