X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a660d684eda27638bca0384b2058911a31c8e845..7946d7deaac081a745dc616a5eb13ae864865fa2:/docs/latex/wx/settings.tex?ds=sidebyside

diff --git a/docs/latex/wx/settings.tex b/docs/latex/wx/settings.tex
index c85151e9b6..88474c6b89 100644
--- a/docs/latex/wx/settings.tex
+++ b/docs/latex/wx/settings.tex
@@ -8,6 +8,10 @@ and user interface element sizes.
 
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/settings.h>
+
 \wxheading{See also}
 
 \helpref{wxFont}{wxfont}, \helpref{wxColour}{wxcolour}
@@ -64,6 +68,9 @@ Returns a system colour.
 \twocolitem{{\bf wxSYS\_COLOUR\_BTNHILIGHT}}{Same as wxSYS\_COLOUR\_BTNHIGHLIGHT.}
 \end{twocollist}
 
+\pythonnote{This static method is implemented in Python as a
+standalone function named {\tt wxSystemSettings\_GetSystemColour}}
+
 \membersection{wxSystemSettings::GetSystemFont}\label{wxsystemsettingsgetsystemfont}
 
 \func{static wxFont}{GetSystemFont}{\param{int}{ index}}
@@ -83,6 +90,9 @@ Returns a system font.
 Not available in versions of Windows earlier than Windows 95 or Windows NT 4.0.}
 \end{twocollist}
 
+\pythonnote{This static method is implemented in Python as a
+standalone function named {\tt wxSystemSettings\_GetSystemFont}}
+
 \membersection{wxSystemSettings::GetSystemMetric}\label{wxsystemsettingsgetsystemmetric}
 
 \func{static int}{GetSystemMetric}{\param{int}{ index}}
@@ -139,3 +149,6 @@ where it would otherwise present the information only in audible form; zero othe
 \twocolitem{{\bf wxSYS\_SWAP\_BUTTONS}}{Non-zero if the meanings of the left and right mouse buttons are swapped; zero otherwise.}
 \end{twocollist}
 
+\pythonnote{This static method is implemented in Python as a
+standalone function named {\tt wxSystemSettings\_GetSystemMetric}}
+
