X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a660d684eda27638bca0384b2058911a31c8e845..6b037754f53cc35e177bf6787bace26c7cecc6e1:/docs/latex/wx/minifram.tex

diff --git a/docs/latex/wx/minifram.tex b/docs/latex/wx/minifram.tex
index 3e19a84cb5..c749a749eb 100644
--- a/docs/latex/wx/minifram.tex
+++ b/docs/latex/wx/minifram.tex
@@ -52,7 +52,7 @@ it behaves like a normal frame.
 
 Default constructor.
 
-\func{}{wxMiniFrame}{\param{wxWindow* }{parent}, \param{const wxWindowID }{id},\rtfsp
+\func{}{wxMiniFrame}{\param{wxWindow* }{parent}, \param{wxWindowID }{id},\rtfsp
 \param{const wxString\& }{title}, \param{const wxPoint\&}{ pos = wxDefaultPosition},\rtfsp
 \param{const wxSize\&}{ size = wxDefaultSize}, \param{long}{ style = wxDEFAULT\_FRAME\_STYLE},\rtfsp
 \param{const wxString\& }{name = ``frame"}}
@@ -96,7 +96,7 @@ Destructor. Destroys all child windows and menu bar if present.
 
 \membersection{wxMiniFrame::Create}\label{wxminiframecreate}
 
-\func{bool}{Create}{\param{wxWindow* }{parent}, \param{const wxWindowID }{id},\rtfsp
+\func{bool}{Create}{\param{wxWindow* }{parent}, \param{wxWindowID }{id},\rtfsp
 \param{const wxString\& }{title}, \param{const wxPoint\&}{ pos = wxDefaultPosition},\rtfsp
 \param{const wxSize\&}{ size = wxDefaultSize}, \param{long}{ style = wxDEFAULT\_FRAME\_STYLE},\rtfsp
 \param{const wxString\& }{name = ``frame"}}
