X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a660d684eda27638bca0384b2058911a31c8e845..3cb99894576612e347480d43c5f2e2550b6151cf:/docs/latex/wx/object.tex?ds=inline

diff --git a/docs/latex/wx/object.tex b/docs/latex/wx/object.tex
index 1cce58e408..7c27d7a304 100644
--- a/docs/latex/wx/object.tex
+++ b/docs/latex/wx/object.tex
@@ -26,7 +26,9 @@ wxPen, wxBitmap and others.
 
 \func{}{wxObject}{\void}
 
-Default constructor.
+\func{}{wxObject}{\param{const wxObject\&}{ other}}
+
+Default and copy constructors.
 
 \membersection{wxObject::\destruct{wxObject}}
 
@@ -52,9 +54,12 @@ Pointer to an object which is the object's reference-counted data.
 
 \func{void}{Dump}{\param{ostream\&}{ stream}}
 
-A virtual function that should be redefined by derived classes to allow dumping of
+A virtual function that may be redefined by derived classes to allow dumping of
 memory states.
 
+This function is only defined in debug build and doesn't exist at all if
+{\tt \_\_WXDEBUG\_\_} is not defined.
+
 \wxheading{Parameters}
 
 \docparam{stream}{Stream on which to output dump information.}
@@ -63,10 +68,11 @@ memory states.
 
 Currently wxWindows does not define Dump for derived classes, but
 programmers may wish to use it for their own applications. Be sure to
-call the Dump member of the class's base class to allow all information to be dumped.
+call the Dump member of the class's base class to allow all information to be
+dumped.
 
-The implementation of this function just writes the class name of the object.
-If DEBUG is undefined or zero, the implementation is empty.
+The implementation of this function in wxObject just writes the class name of
+the object.
 
 \membersection{wxObject::GetClassInfo}\label{wxobjectgetclassinfo}
 
@@ -101,7 +107,7 @@ by using the CLASSINFO macro.}
 
 \wxheading{Return value}
 
-TRUE if the class represented by {\it info} is the same class as
+true if the class represented by {\it info} is the same class as
 this one or is derived from it.
 
 \wxheading{Example}
@@ -164,7 +170,7 @@ The {\bf m\_refData} member is set to NULL.
 \func{void *}{new}{\param{size\_t }{size}, \param{const wxString\& }{filename = NULL}, \param{int}{ lineNum = 0}}
 
 The {\it new} operator is defined for debugging versions of the library only, when
-the identifier DEBUG is defined and is more than zero. It takes over memory allocation, allowing
+the identifier \_\_WXDEBUG\_\_ is defined. It takes over memory allocation, allowing
 wxDebugContext operations.
 
 \membersection{wxObject::operator delete}\label{wxobjectdelete}
@@ -172,7 +178,7 @@ wxDebugContext operations.
 \func{void}{delete}{\param{void }{buf}}
 
 The {\it delete} operator is defined for debugging versions of the library only, when
-the identifier DEBUG is defined and is more than zero. It takes over memory deallocation, allowing
+the identifier \_\_WXDEBUG\_\_ is defined. It takes over memory deallocation, allowing
 wxDebugContext operations.
 
 \section{\class{wxObjectRefData}}\label{wxobjectrefdata}
