X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a660d684eda27638bca0384b2058911a31c8e845..0f3e3e0c300988a7520b39b90d28517b84882190:/docs/latex/wx/postscpt.tex?ds=sidebyside

diff --git a/docs/latex/wx/postscpt.tex b/docs/latex/wx/postscpt.tex
index e654c282d8..b1bd9adda5 100644
--- a/docs/latex/wx/postscpt.tex
+++ b/docs/latex/wx/postscpt.tex
@@ -9,8 +9,16 @@ descriptions of the member functions.
 \helpref{wxDC}{wxdc}\\
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/dcps.h>
+
 \membersection{wxPostScriptDC::wxPostScriptDC}
 
+\func{}{wxPostScriptDC}{\param{const wxPrintData\&}{ printData}}
+
+Constructs a PostScript printer device context from a \helpref{wxPrintData}{wxprintdata} object.
+
 \func{}{wxPostScriptDC}{\param{const wxString\& }{output}, \param{bool }{interactive = TRUE},\\
   \param{wxWindow *}{parent}}
 
@@ -24,6 +32,9 @@ in creating a useable device context.
 See \helpref{Printer settings}{printersettings} for functions to set and
 get PostScript printing settings.
 
+This constructor and the global printer settings are now deprecated;
+use the wxPrintData constructor instead.
+
 \membersection{wxPostScriptDC::GetStream}
 
 \func{ostream *}{GetStream}{\void}
