X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a5f1fd3e33d25740ad47e4755868c74a58c0f9eb..8b6e6947fc8fb946391740d66b140413eccb6b6c:/docs/latex/wx/app.tex

diff --git a/docs/latex/wx/app.tex b/docs/latex/wx/app.tex
index f662fd4048..c71c82dbec 100644
--- a/docs/latex/wx/app.tex
+++ b/docs/latex/wx/app.tex
@@ -231,7 +231,7 @@ Returns 0 under X, and the wParam of the WM\_QUIT message under Windows.
 
 This function is called when an assert failure occurs, i.e. the condition
 specified in \helpref{wxASSERT}{wxassert} macro evaluated to {\tt FALSE}.
-It is only called in debug mode (when {\tt \_\_WXDEBUG\_\_| is defined) as
+It is only called in debug mode (when {\tt \_\_WXDEBUG\_\_} is defined) as
 asserts are not left in the release code at all.
 
 The base class version show the default assert failure dialog box proposing to
@@ -425,8 +425,9 @@ Under Windows, OnQueryEndSession is called in response to the WM\_QUERYENDSESSIO
 
 \helpref{wxWindow::Close}{wxwindowclose},\rtfsp
 \helpref{wxWindow::OnCloseWindow}{wxwindowonclosewindow},\rtfsp
-\helpref{wxCloseEvent}{wxcloseevent},\rtfsp
-\helpref{wxApp::OnEndSession}{wxapponendsession}
+\helpref{wxCloseEvent}{wxcloseevent}
+%% GD: OnXXX functions are not documented
+%%\helpref{wxApp::OnEndSession}{wxapponendsession}
 
 \membersection{wxApp::ProcessMessage}\label{wxappprocessmessage}
 
@@ -479,7 +480,10 @@ If TRUE is returned, more OnIdle processing is requested by one or more window.
 
 \wxheading{See also}
 
-\helpref{wxApp::OnIdle}{wxapponidle}, \helpref{wxWindow::OnIdle}{wxwindowonidle}, \helpref{wxIdleEvent}{wxidleevent}
+%% GD: OnXXX functions are not documented
+%%\helpref{wxApp::OnIdle}{wxapponidle}
+\helpref{wxWindow::OnIdle}{wxwindowonidle},\rtfsp
+\helpref{wxIdleEvent}{wxidleevent}
 
 \membersection{wxApp::SetAppName}\label{wxappsetappname}
 
