X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a5ae8241de5d07fc10d8fa6ba9c0faa1457521b8..e53a95bcb122a06a74e116aba717b0d7a5bdc1b8:/docs/latex/wx/hteasypr.tex?ds=sidebyside

diff --git a/docs/latex/wx/hteasypr.tex b/docs/latex/wx/hteasypr.tex
index 418454f349..5418d50852 100644
--- a/docs/latex/wx/hteasypr.tex
+++ b/docs/latex/wx/hteasypr.tex
@@ -93,12 +93,6 @@ information about the kind of the error.
 \docparam{basepath}{base directory (html string would be stored there if it was in
 file). It is used to determine path for loading images, for example.}
 
-\membersection{wxHtmlEasyPrinting::PrinterSetup}\label{wxhtmleasyprintingprintersetup}
-
-\func{void}{PrinterSetup}{\void}
-
-Display printer setup dialog and allows the user to modify settings. 
-
 \membersection{wxHtmlEasyPrinting::PageSetup}\label{wxhtmleasyprintingpagesetup}
 
 \func{void}{PageSetup}{\void}
