X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a4f7b480c1132509b1890b90342744cd3013c517..c63312c472c83be6d3b935f0ceeef484a7d611ce:/docs/latex/wx/listctrl.tex

diff --git a/docs/latex/wx/listctrl.tex b/docs/latex/wx/listctrl.tex
index 33777d9597..05aa3c6578 100644
--- a/docs/latex/wx/listctrl.tex
+++ b/docs/latex/wx/listctrl.tex
@@ -573,7 +573,7 @@ list or report views (this is a limitation of the native Win32 control).
 
 \membersection{wxListCtrl::HitTest}\label{wxlistctrlhittest}
 
-\func{long}{HitTest}{\param{const wxPoint\& }{point}, \param{int\& }{flags}, \param{long\* }{ptrSubItem}}
+\constfunc{long}{HitTest}{\param{const wxPoint\& }{point}, \param{int\& }{flags}, \param{long *}{ptrSubItem}}
 
 Determines which item (if any) is at the specified point,
 giving details in {\it flags}. Returns index of the item or {\tt wxNOT\_FOUND}
