X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a203f6c0995030dc59ad4c0bbd3104d67ac4ac66..5125ea1f83ee0b64c6e26c17823f6e389f7b633f:/docs/latex/wx/tunicode.tex

diff --git a/docs/latex/wx/tunicode.tex b/docs/latex/wx/tunicode.tex
index 0a4d94291f..b275ebca66 100644
--- a/docs/latex/wx/tunicode.tex
+++ b/docs/latex/wx/tunicode.tex
@@ -177,7 +177,7 @@ the Unicode string.
 You should define {\tt wxUSE\_UNICODE} to $1$ to compile your program in
 Unicode mode. Note that it currently only works in Win32 and GTK 2.0 and
 that some parts of
-wxWidgets are not Unicode-compliant yet (ODBC classes, for example). If you
+wxWidgets are not Unicode-compliant yet. If you
 compile your program in ANSI mode you can still define {\tt wxUSE\_WCHAR\_T} 
 to get some limited support for {\tt wchar\_t} type.
 
