X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a203f6c0995030dc59ad4c0bbd3104d67ac4ac66..2a7d0c10c378eaa6edd7a61e87b7c542cf8fc884:/docs/latex/wx/outptstr.tex

diff --git a/docs/latex/wx/outptstr.tex b/docs/latex/wx/outptstr.tex
index 2be79230ad..1c61a7c606 100644
--- a/docs/latex/wx/outptstr.tex
+++ b/docs/latex/wx/outptstr.tex
@@ -19,20 +19,33 @@ wxOutputStream is an abstract base class which may not be used directly.
 % ctor & dtor
 % -----------
 
-\membersection{wxOutputStream::wxOutputStream}
+\membersection{wxOutputStream::wxOutputStream}\label{wxoutputstreamctor}
 
 \func{}{wxOutputStream}{\void}
 
 Creates a dummy wxOutputStream object.
 
 
-\membersection{wxOutputStream::\destruct{wxOutputStream}}
+\membersection{wxOutputStream::\destruct{wxOutputStream}}\label{wxoutputstreamdtor}
 
 \func{}{\destruct{wxOutputStream}}{\void}
 
 Destructor.
 
 
+\membersection{wxOutputStream::Close}\label{wxoutputstreamclose}
+
+\func{bool}{Close}{\void}
+
+Closes the stream, returning {\tt false} if an error occurs. The
+stream is closed implicitly in the destructor if Close() is not
+called explicitly.
+
+If this stream wraps another stream or some other resource such
+as a file, then the underlying resource is closed too if it is owned
+by this stream, or left open otherwise.
+
+
 \membersection{wxOutputStream::LastWrite}\label{wxoutputstreamlastwrite}
 
 \constfunc{size\_t}{LastWrite}{\void}
@@ -42,7 +55,7 @@ Returns the number of bytes written during the last
 error on the stream if it is only temporarily impossible to write to it.
 
 
-\membersection{wxOutputStream::PutC}
+\membersection{wxOutputStream::PutC}\label{wxoutputstreamputc}
 
 \func{void}{PutC}{\param{char}{ c}}
 
