X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a203f6c0995030dc59ad4c0bbd3104d67ac4ac66..0fb0ecc4528966916edd520aeb2acc1a69aadd3b:/docs/latex/wx/texcept.tex

diff --git a/docs/latex/wx/texcept.tex b/docs/latex/wx/texcept.tex
index 8c5e8fe771..58344d0ddb 100644
--- a/docs/latex/wx/texcept.tex
+++ b/docs/latex/wx/texcept.tex
@@ -6,7 +6,7 @@
 %% Created:     17.09.03
 %% RCS-ID:      $Id$
 %% Copyright:   (c) 2003 Vadim Zeitlin
-%% License:     wxWidgets license
+%% License:     wxWindows license
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
 
 \section{C++ exceptions overview}\label{exceptionsoverview}
@@ -14,7 +14,7 @@
 \subsection{Introduction}\label{exceptionintroduction}
 
 wxWidgets had been started long before the exceptions were introduced in C++ so
-it is not very surprizing that it is not built around using them as some more
+it is not very surprising that it is not built around using them as some more
 modern C++ libraries are. For instance, the library doesn't throw exceptions to
 signal about the errors. Moreover, up to (and including) the version 2.4 of
 wxWidgets, even using the exceptions in the user code was dangerous because the
