X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a1d8baa9f252ad9129ded13d5d6a2b30fcad97e6..9e152a55785098472ca1c0df110ad0a1203f710f:/docs/latex/wx/threadh.tex

diff --git a/docs/latex/wx/threadh.tex b/docs/latex/wx/threadh.tex
index 806452f1e2..34b5c0f60b 100644
--- a/docs/latex/wx/threadh.tex
+++ b/docs/latex/wx/threadh.tex
@@ -89,7 +89,7 @@ The returned value is the thread exit code which is only useful for
 joinable threads and is the value returned by
 \helpref{GetThread()->Wait()}{wxthreadwait}.
 
-This function is called by wxWindows itself and should never be called
+This function is called by wxWidgets itself and should never be called
 directly.
 
 \membersection{wxThreadHelper::GetThread}\label{wxthreadhelpergetthread}
