X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a16a4ab1566db47ab343d3ad70eb09261eead0e2..097119648b492237f16acdf484eff8900c7c94d2:/docs/latex/wx/toolbar.tex?ds=sidebyside

diff --git a/docs/latex/wx/toolbar.tex b/docs/latex/wx/toolbar.tex
index 6ec2b91e40..bb7f8ada0b 100644
--- a/docs/latex/wx/toolbar.tex
+++ b/docs/latex/wx/toolbar.tex
@@ -71,6 +71,9 @@ use this option under Windows XP with true colour:
 \twocolitem{\windowstyle{wxTB\_HORZ\_LAYOUT}}{Shows the text and the icons alongside, not vertically stacked (Windows and GTK
 2 only). This style must be used with wxTB\_TEXT.}
 \twocolitem{\windowstyle{wxTB\_HORZ\_TEXT}}{Combination of wxTB\_HORZ\_LAYOUT and wxTB\_TEXT.}
+\twocolitem{\windowstyle{wxTB\_NO\_TOOLTIPS}}{Don't show the short help tooltips for the tools when the mouse hovers over them.}
+\twocolitem{\windowstyle{wxTB\_BOTTOM}}{Align the toolbar at the bottom of parent window.}
+\twocolitem{\windowstyle{wxTB\_RIGHT}}{Align the toolbar at the right side of parent window.}
 \end{twocollist}
 
 See also \helpref{window styles overview}{windowstyles}. Note that the Win32
@@ -101,6 +104,24 @@ Pass the id of the tool.}
 for a range of ids. Pass the ids of the tools.}
 \twocolitem{{\bf EVT\_TOOL\_ENTER(id, func)}}{Process a wxEVT\_COMMAND\_TOOL\_ENTER event.
 Pass the id of the toolbar itself. The value of wxCommandEvent::GetSelection is the tool id, or -1 if the mouse cursor has moved off a tool.}
+\twocolitem{{\bf EVT\_TOOL\_DROPDOWN(id, func)}}{Process a wxEVT\_COMMAND\_TOOL\_DROPDOWN\_CLICKED event. If unhandled, displays the default dropdown menu set using \helpref{wxToolBar::SetDropdownMenu}{wxtoolbarsetdropdownmenu}.}
+\end{twocollist}
+
+\wxheading{wxItemKind}
+
+There are several different types of tools you can add to a toolbar. These
+types are controlled by the wxItemKind enumeration which has the following
+values:
+\twocolwidtha{5cm}
+\begin{twocollist}\itemsep=0pt
+\twocolitem{{\bf wxITEM\_NORMAL}}{Normal tool button}
+\twocolitem{{\bf wxITEM\_CHECK}}{Check (or toggle) tool button.}
+\twocolitem{{\bf wxITEM\_NORMAL}}{Radio tool button. See \helpref{wxToolBar::AddRadioTool}{wxtoolbaraddradiotool} for details}
+\twocolitem{{\bf wxITEM\_DROPDOWN}}{Normal tool button with a dropdown arrow
+next to it. Clicking the dropdown arrow sends a wxEVT\_COMMAND\_TOOL\_DROPDOWN\_CLICKED
+event and may also display the menu previously associated with the item with 
+\helpref{wxToolBar::SetDropdownMenu}{wxtoolbarsetdropdownmenu}. Currently this
+type of tools is supported under MSW and GTK.}
 \end{twocollist}
 
 \wxheading{See also}
@@ -120,7 +141,7 @@ Default constructor.
 \func{}{wxToolBar}{\param{wxWindow*}{ parent}, \param{wxWindowID }{id},
  \param{const wxPoint\& }{pos = wxDefaultPosition},
  \param{const wxSize\& }{size = wxDefaultSize},
- \param{long }{style = wxTB\_HORIZONTAL \pipe wxNO\_BORDER},
+ \param{long }{style = wxTB\_HORIZONTAL \pipe wxBORDER\_NONE},
  \param{const wxString\& }{name = wxPanelNameStr}}
 
 Constructs a toolbar.
@@ -162,12 +183,20 @@ Toolbar destructor.
 
 \membersection{wxToolBar::AddControl}\label{wxtoolbaraddcontrol}
 
-\func{bool}{AddControl}{\param{wxControl*}{ control}}
+\func{bool}{AddControl}{\param{wxControl*}{ control}, \param{const wxString&}{ label = ""}}
 
 Adds any control to the toolbar, typically e.g. a combobox.
 
 \docparam{control}{The control to be added.}
 
+\docparam{label}{Text to be displayed near the control.}
+
+\wxheading{Remarks}
+
+wxMSW: the label is only displayed if there is enough space available below the embedded control.
+
+wxMac: labels are only displayed if wxWidgets is built with wxMAC\_USE\_NATIVE\_TOOLBAR set to 1
+
 
 \membersection{wxToolBar::AddSeparator}\label{wxtoolbaraddseparator}
 
@@ -287,6 +316,11 @@ others are not.
 
 \helpref{wxToolBar::AddTool}{wxtoolbaraddtool}
 
+\membersection{wxToolBar::ClearTools}\label{wxtoolbarcleartools}
+
+\func{void}{ClearTools}{\void}
+
+Deletes all the tools in the toolbar.
 
 \membersection{wxToolBar::DeleteTool}\label{wxtoolbardeletetool}
 
@@ -316,7 +350,7 @@ deletes the tool at the specified position and not the one with the given id.
 
 \membersection{wxToolBar::EnableTool}\label{wxtoolbarenabletool}
 
-\func{void}{EnableTool}{\param{int }{toolId}, \param{const bool}{ enable}}
+\func{void}{EnableTool}{\param{int }{toolId}, \param{bool}{ enable}}
 
 Enables or disables the tool.
 
@@ -357,7 +391,7 @@ Returns a pointer to the control identified by \arg{id} or
 
 \membersection{wxToolBar::FindToolForPosition}\label{wxtoolbarfindtoolforposition}
 
-\constfunc{wxToolBarToolBase*}{FindToolForPosition}{\param{const float}{ x}, \param{const float}{ y}}
+\constfunc{wxToolBarToolBase*}{FindToolForPosition}{\param{wxCoord }{x}, \param{wxCoord }{y}}
 
 Finds a tool for the given mouse position.
 
@@ -376,6 +410,13 @@ A pointer to a tool if a tool is found, or \NULL otherwise.
 Currently not implemented in wxGTK (always returns \NULL there).
 
 
+\membersection{wxToolBar::GetToolsCount}\label{wxtoolbargettoolscount}
+
+\constfunc{int}{GetToolsCount}{\void}
+
+Returns the number of tools in the toolbar.
+
+
 \membersection{wxToolBar::GetToolSize}\label{wxtoolbargettoolsize}
 
 \func{wxSize}{GetToolSize}{\void}
@@ -715,6 +756,17 @@ default (zero-size) margins are to be overridden.
 \helpref{wxToolBar::GetMargins}{wxtoolbargetmargins}, \helpref{wxSize}{wxsize}
 
 
+\membersection{wxToolBar::SetDropdownMenu}\label{wxtoolbarsetdropdownmenu}
+
+\func{bool}{SetDropdownMenu}{\param{int }{id}, \param{wxMenu* }{menu}}
+
+Sets the dropdown menu for the tool given by its \arg{id}. The tool itself will
+delete the menu when it's no longer needed.
+
+If you define a EVT\_TOOL\_DROPDOWN handler in your program, you must call 
+\helpref{wxEvent::Skip()}{wxeventskip} from it or the menu won't be displayed.
+
+
 \membersection{wxToolBar::SetToolBitmapSize}\label{wxtoolbarsettoolbitmapsize}
 
 \func{void}{SetToolBitmapSize}{\param{const wxSize\&}{ size}}
@@ -746,6 +798,17 @@ and not the eventual size of the tool button.
 Sets the client data associated with the tool.
 
 
+\membersection{wxToolBar::SetToolDisabledBitmap}\label{wxtoolbarsettooldisabledbitmap}
+
+\func{void}{SetToolDisabledBitmap}{\param{int }{id}, \param{const wxBitmap\& }{bitmap}}
+
+Sets the bitmap to be used by the tool with the given ID when the tool
+is in a disabled state.  This can only be used on Button tools, not
+controls.  NOTE: The native toolbar classes on the main platforms all
+synthesize the disabled bitmap from the normal bitmap, so this
+function will have no effect on those platforms.
+
+
 \membersection{wxToolBar::SetToolLongHelp}\label{wxtoolbarsettoollonghelp}
 
 \func{void}{SetToolLongHelp}{\param{int }{toolId}, \param{const wxString\& }{helpString}}
@@ -809,6 +872,15 @@ An application might use short help for identifying the tool purpose in a toolti
 \helpref{wxToolBar::GetToolShortHelp}{wxtoolbargettoolshorthelp}, \helpref{wxToolBar::SetToolLongHelp}{wxtoolbarsettoollonghelp}
 
 
+\membersection{wxToolBar::SetToolNormalBitmap}\label{wxtoolbarsettoolnormalbitmap}
+
+\func{void}{SetToolNormalBitmap}{\param{int }{id}, \param{const wxBitmap\& }{bitmap}}
+
+Sets the bitmap to be used by the tool with the given ID.  This can
+only be used on Button tools, not controls.
+
+
+
 \membersection{wxToolBar::SetToolSeparation}\label{wxtoolbarsettoolseparation}
 
 \func{void}{SetToolSeparation}{\param{int}{ separation}}
@@ -826,7 +898,7 @@ Sets the default separator size. The default value is 5.
 
 \membersection{wxToolBar::ToggleTool}\label{wxtoolbartoggletool}
 
-\func{void}{ToggleTool}{\param{int }{toolId}, \param{const bool}{ toggle}}
+\func{void}{ToggleTool}{\param{int }{toolId}, \param{bool}{ toggle}}
 
 Toggles a tool on or off. This does not cause any event to get emitted.
 
