X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/a0afe18fcff2185d6ac4e6eda518da7879c3d3b9..c2f12218ce9231e0d21a0d5516fcaa7df3e0a2a0:/docs/latex/wx/dc.tex

diff --git a/docs/latex/wx/dc.tex b/docs/latex/wx/dc.tex
index e0f3256f49..cbfb91daee 100644
--- a/docs/latex/wx/dc.tex
+++ b/docs/latex/wx/dc.tex
@@ -883,7 +883,7 @@ Gets the minimum horizontal extent used in drawing commands so far.
 Gets the minimum vertical extent used in drawing commands so far.
 
 
-\membersection{wxDC::Ok}\label{wxdcok}
+\membersection{wxDC::IsOk}\label{wxdcisok}
 
 \func{bool}{Ok}{\void}
 
