X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9ef63a4a59eccce6cd8787f0ed966bfa8365a22e..5b222f1c9e0acb63c781675555c76f6129316eb1:/docs/latex/wx/statusbr.tex

diff --git a/docs/latex/wx/statusbr.tex b/docs/latex/wx/statusbr.tex
index 72ca80f542..70754447b3 100644
--- a/docs/latex/wx/statusbr.tex
+++ b/docs/latex/wx/statusbr.tex
@@ -138,6 +138,24 @@ The status field string if the field is valid, otherwise the empty string.
 
 \helpref{wxStatusBar::SetStatusText}{wxstatusbarsetstatustext}
 
+\membersection{wxStatusBar::PopStatusText}\label{wxstatusbarpushstatustext}
+
+\func{void}{PopStatusText}{\param{int}{ field = 0}}
+
+Sets the field text to the top of the stack, and pops the stack of saved
+strings.
+
+\wxheading{See also}
+
+\helpref{wxStatusBar::PushStatusText}{wxstatusbarpushstatustext}
+
+\membersection{wxStatusBar::PushStatusText}\label{wxstatusbarpushstatustext}
+
+\func{void}{PushStatusText}{\param{const wxString&}{ string}, \param{int}{ field = 0}}
+
+Saves the current field text in a per field stack, and sets the field text
+to the string passed as argument.
+
 %% VZ: these functions are not in wxStatusBar API, these are just
 %%     implementation details of wxStatusBarGeneric
 %%
@@ -213,7 +231,7 @@ Sets the number of fields, and optionally the field widths.
 \pythonnote{Only the first parameter is accepted.  Use SetStatusWidths
 to set the widths of the fields.}
 
-\perlnote{In wxPerl this function acceps only the {\tt n} parameter.
+\perlnote{In wxPerl this function accepts only the {\tt n} parameter.
 Use SetStatusWidths to set the field widths.}
 
 \wxheading{Parameters}
