X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9ebb7cade2df5aeb8531950d2a79cd57a336bcec..d2b23b67301bd2d286366d4326a21da3132558fa:/docs/latex/wx/vlbox.tex

diff --git a/docs/latex/wx/vlbox.tex b/docs/latex/wx/vlbox.tex
index 00e4c8f295..189a9642af 100644
--- a/docs/latex/wx/vlbox.tex
+++ b/docs/latex/wx/vlbox.tex
@@ -367,6 +367,10 @@ Sets the colour to be used for the selected cells background. The background of
 the standard cells may be changed by simply calling
 \helpref{SetBackgroundColour}{wxwindowsetbackgroundcolour}.
 
+Notice that using non-default background colour may result in control having
+appearance different from the similar native controls and so should in general
+be avoided.
+
 \wxheading{See also}
 
 \helpref{GetSelectionBackground}{wxvlistboxgetselectionbackground}
