X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9eb11d19b13870292f3ccd340c67d7e148761db5..593177c566d3471189571641fb9db8efa27ed551:/docs/latex/wx/db.tex

diff --git a/docs/latex/wx/db.tex b/docs/latex/wx/db.tex
index e7264d3c24..1e7a688641 100644
--- a/docs/latex/wx/db.tex
+++ b/docs/latex/wx/db.tex
@@ -1383,7 +1383,7 @@ When called with {\it sqlLogOFF}, the logging file is closed, and any calls to \
 
 \membersection{wxDb::SQLColumnName}\label{wxdbsqlcolumnname}
 
-\func{const wxString}{SQLColumnName}{\param{const char *}{ colName}}
+\func{const wxString}{SQLColumnName}{\param{const wxChar *}{ colName}}
 
 Returns the column name in a form ready for use in SQL statements.
 In most cases, the column name is returned verbatim.  But some databases
@@ -1405,7 +1405,7 @@ before including the column name in a SQL statement}
 
 \membersection{wxDb::SQLTableName}\label{wxdbsqltablename}
 
-\func{const wxString}{SQLTableName}{\param{const char *}{ tableName}}
+\func{const wxString}{SQLTableName}{\param{const wxChar *}{ tableName}}
 
 Returns the table name in a form ready for use in SQL statements.
 In most cases, the table name is returned verbatim.  But some databases
