X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9eab353ce3751c8e4f047567a181785022015b6e..a245fd31a60b7c222a84c80d528a253e163ccb43:/docs/latex/wx/splitter.tex?ds=inline

diff --git a/docs/latex/wx/splitter.tex b/docs/latex/wx/splitter.tex
index 3c09fc7a71..6f18e23181 100644
--- a/docs/latex/wx/splitter.tex
+++ b/docs/latex/wx/splitter.tex
@@ -297,12 +297,12 @@ Gravity tells wxSplitterWindow how much will left/top window grow while resizing
 
 Example values:
 \begin{itemize}\itemsep=0pt
-\item{ 0.0  - only the bottom/right window is automaticaly resized}
+\item{ 0.0  - only the bottom/right window is automatically resized}
 \item{ 0.5  - both windows grow by equal size}
 \item{ 1.0  - only left/top window grows}
 \end{itemize}
 
-Gravity should be real value betwwen 0.0 and 1.0.
+Gravity should be a real value between 0.0 and 1.0.
 
 Default value of sash gravity is 0.0. That value is compatible with previous 
 (before gravity was introduced) behaviour of wxSplitterWindow.
@@ -396,7 +396,7 @@ child windows are shown if they are currently hidden.
 \docparam{window2}{The bottom pane.}
 
 \docparam{sashPosition}{The initial position of the sash. If this value is
-positive, it specifies the size of the upper pane. If it is negative, it is
+positive, it specifies the size of the upper pane. If it is negative, its
 absolute value gives the size of the lower pane. Finally, specify 0 (default)
 to choose the default position (half of the total window height).}
 
