X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9eab353ce3751c8e4f047567a181785022015b6e..85136e3bf5dadf921652519e71da5db351fb3194:/docs/latex/wx/splitter.tex

diff --git a/docs/latex/wx/splitter.tex b/docs/latex/wx/splitter.tex
index 3c09fc7a71..d96e85ddb2 100644
--- a/docs/latex/wx/splitter.tex
+++ b/docs/latex/wx/splitter.tex
@@ -33,6 +33,10 @@ See also \helpref{window styles overview}{windowstyles}.
 
 <wx/splitter.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Event handling}
 
 To process input from a splitter control, use the following event handler
@@ -297,12 +301,12 @@ Gravity tells wxSplitterWindow how much will left/top window grow while resizing
 
 Example values:
 \begin{itemize}\itemsep=0pt
-\item{ 0.0  - only the bottom/right window is automaticaly resized}
+\item{ 0.0  - only the bottom/right window is automatically resized}
 \item{ 0.5  - both windows grow by equal size}
 \item{ 1.0  - only left/top window grows}
 \end{itemize}
 
-Gravity should be real value betwwen 0.0 and 1.0.
+Gravity should be a real value between 0.0 and 1.0.
 
 Default value of sash gravity is 0.0. That value is compatible with previous 
 (before gravity was introduced) behaviour of wxSplitterWindow.
@@ -396,7 +400,7 @@ child windows are shown if they are currently hidden.
 \docparam{window2}{The bottom pane.}
 
 \docparam{sashPosition}{The initial position of the sash. If this value is
-positive, it specifies the size of the upper pane. If it is negative, it is
+positive, it specifies the size of the upper pane. If it is negative, its
 absolute value gives the size of the lower pane. Finally, specify 0 (default)
 to choose the default position (half of the total window height).}
 
