X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9dfaa4733cae3a5ee7941233bf78168d3ddf2325..7e2bb04d4e4c6f9bf91318d139bb33ca41c51065:/src/png/scripts/pngos2.def

diff --git a/src/png/scripts/pngos2.def b/src/png/scripts/pngos2.def
index 92cd5aafbe..1b75bc6036 100644
--- a/src/png/scripts/pngos2.def
+++ b/src/png/scripts/pngos2.def
@@ -2,7 +2,7 @@
 ; PNG.LIB module definition file for OS/2
 ;----------------------------------------
 
-; Version 1.2.4
+; Version 1.2.7
 
 LIBRARY		PNG
 DESCRIPTION	"PNG image compression library for OS/2"
@@ -206,6 +206,13 @@ EXPORTS
 ; Added at version 1.2.4
   png_malloc_warn
 
+; Added at version 1.2.6
+  png_set_user_limits
+  png_get_user_height_max
+  png_get_user_width_max
+; Added at version 1.2.7
+  png_set_add_alpha
+
 ; These are not present when libpng is compiled with PNG_NO_GLOBAL_ARRAYS
   png_libpng_ver
   png_pass_start
