X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9d9e5e5a3d23c296bff73e75192368d09144084d..bcf576ccfe754a634034203aa133c02fb5d2f964:/docs/latex/wx/thread.tex?ds=sidebyside

diff --git a/docs/latex/wx/thread.tex b/docs/latex/wx/thread.tex
index 962df682eb..1559443b69 100644
--- a/docs/latex/wx/thread.tex
+++ b/docs/latex/wx/thread.tex
@@ -4,14 +4,14 @@ A thread is basically a path of execution through a program. Threads are
 sometimes called {\it light-weight processes}, but the fundamental difference
 between threads and processes is that memory spaces of different processes are
 separated while all threads share the same address space. While it makes it
-much easier to share common data between several threads, it also makes much
+much easier to share common data between several threads, it also makes it much
 easier to shoot oneself in the foot, so careful use of synchronization objects
 such as \helpref{mutexes}{wxmutex} and/or \helpref{critical sections}{wxcriticalsection} is recommended.
 
-There are two types of threads in wxWindows: {\it detached} and {\it joinable}
+There are two types of threads in wxWidgets: {\it detached} and {\it joinable}
 ones, just as in the POSIX thread API (but unlike Win32 threads where all threads
 are joinable). The difference between the two is that only joinable threads
-can return a return code - this is returned by the Wait() function. Detached
+can return a return code -- this is returned by the Wait() function. Detached
 threads (the default type) cannot be waited for.
 
 You shouldn't hurry to create all the threads joinable, however, because this
@@ -23,9 +23,12 @@ terminate and destroy itself.
 
 This means, of course, that all detached threads {\bf must} be created on the
 heap because the thread will call {\tt delete this;} upon termination. Joinable
-threads may be created on the stack although more usually they will be created on the heap.
-Don't create global thread objects because they allocate memory in their constructor,
-which will cause problems for the memory checking system.
+threads may be created on the stack although more usually they will be created
+on the heap as well. Don't create global thread objects because they allocate
+memory in their constructor, which will cause problems for the memory checking
+system. Finally, another consequence of the handling of the above is that you
+should never delete a detached thread yourself, as this will be done by the
+thread itself when it terminates.
 
 \wxheading{Derived from}
 
@@ -41,12 +44,13 @@ None.
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
+
 \membersection{wxThread::wxThread}\label{wxthreadctor}
 
 \func{}{wxThread}{\param{wxThreadKind }{kind = wxTHREAD\_DETACHED}}
 
 This constructor creates a new detached (default) or joinable C++ thread object. It
-does not create or start execution of the real thread - for this you should
+does not create or start execution of the real thread -- for this you should
 use the \helpref{Create}{wxthreadcreate} and \helpref{Run}{wxthreadrun} methods.
 
 The possible values for {\it kind} parameters are:
@@ -57,12 +61,13 @@ The possible values for {\it kind} parameters are:
 \twocolitem{{\bf wxTHREAD\_JOINABLE}}{Create a joinable thread}
 \end{twocollist}
 
-\membersection{wxThread::\destruct{wxThread}}
+
+\membersection{wxThread::\destruct{wxThread}}\label{wxthreaddtor}
 
 \func{}{\destruct{wxThread}}{\void}
 
 The destructor frees the resources associated with the thread. Notice that you
-should never delete a detached thread - you may only call 
+should never delete a detached thread -- you may only call
 \helpref{Delete}{wxthreaddelete} on it or wait until it terminates (and auto
 destructs) itself. Because the detached threads delete themselves, they can
 only be allocated on the heap.
@@ -71,12 +76,15 @@ Joinable threads should be deleted explicitly. The \helpref{Delete}{wxthreaddele
 will not delete the C++ thread object. It is also safe to allocate them on
 stack.
 
+
 \membersection{wxThread::Create}\label{wxthreadcreate}
 
-\func{wxThreadError}{Create}{\void}
+\func{wxThreadError}{Create}{\param{unsigned int }{stackSize = 0}}
 
 Creates a new thread. The thread object is created in the suspended state, and you
-should call \helpref{Run}{wxthreadrun} to start running it.
+should call \helpref{Run}{wxthreadrun} to start running it.  You may optionally
+specify the stack size to be allocated to it (Ignored on platforms that don't
+support setting it explicitly, eg. Unix).
 
 \wxheading{Return value}
 
@@ -89,6 +97,7 @@ One of:
 \twocolitem{{\bf wxTHREAD\_RUNNING}}{The thread is already running.}
 \end{twocollist}
 
+
 \membersection{wxThread::Delete}\label{wxthreaddelete}
 
 \func{void}{Delete}{\void}
@@ -98,29 +107,25 @@ thread. It asks the thread to terminate and, if the thread code is well
 written, the thread will terminate after the next call to 
 \helpref{TestDestroy}{wxthreadtestdestroy} which should happen quite soon.
 
-However, if the thread doesn't call \helpref{TestDestroy}{wxthreadtestdestroy} 
+However, if the thread doesn't call \helpref{TestDestroy}{wxthreadtestdestroy}
 often enough (or at all), the function will not return immediately, but wait
 until the thread terminates. As it may take a long time, and the message processing
 is not stopped during this function execution, message handlers may be
 called from inside it!
 
-Delete() may be called for thread in any state: running, paused or even not yet
-created. Moreover, it must be called if \helpref{Create}{wxthreadcreate} or 
-\helpref{Run}{wxthreadrun} failed for a detached thread to free the memory
-occupied by the thread object. This cleanup will be done in the destructor for joinable
-threads.
-
-Delete() may be called for a thread in any state: running, paused or even not yet created. Moreover,
-it must be called if \helpref{Create}{wxthreadcreate} or \helpref{Run}{wxthreadrun} fail to free
-the memory occupied by the thread object. However, you should not call Delete()
-on a detached thread which already terminated - doing so will probably result
-in a crash because the thread object doesn't exist any more.
+Delete() may be called for a thread in any state: running, paused or even not
+yet created. Moreover, it must be called if \helpref{Create}{wxthreadcreate} or
+\helpref{Run}{wxthreadrun} fail in order to free the memory occupied by the
+thread object. However, you should not call Delete() on a detached thread which
+already terminated -- doing so will probably result in a crash because the
+thread object doesn't exist any more.
 
 For detached threads Delete() will also delete the C++ thread object, but it
 will not do this for joinable ones.
 
 This function can only be called from another thread context.
 
+
 \membersection{wxThread::Entry}\label{wxthreadentry}
 
 \func{virtual ExitCode}{Entry}{\void}
@@ -131,9 +136,10 @@ be implemented by any derived class. The thread execution will start here.
 The returned value is the thread exit code which is only useful for
 joinable threads and is the value returned by \helpref{Wait}{wxthreadwait}.
 
-This function is called by wxWindows itself and should never be called
+This function is called by wxWidgets itself and should never be called
 directly.
 
+
 \membersection{wxThread::Exit}\label{wxthreadexit}
 
 \func{void}{Exit}{\param{ExitCode }{exitcode = 0}}
@@ -143,9 +149,10 @@ from a derived class. It also can only be called in the context of this
 thread, i.e. a thread can only exit from itself, not from another thread.
 
 This function will terminate the OS thread (i.e. stop the associated path of
-execution) and also delete the associated C++ object for detached threads. 
+execution) and also delete the associated C++ object for detached threads.
 \helpref{wxThread::OnExit}{wxthreadonexit} will be called just before exiting.
 
+
 \membersection{wxThread::GetCPUCount}\label{wxthreadgetcpucount}
 
 \func{static int}{GetCPUCount}{\void}
@@ -156,6 +163,16 @@ Returns the number of system CPUs or -1 if the value is unknown.
 
 \helpref{SetConcurrency}{wxthreadsetconcurrency}
 
+
+\membersection{wxThread::GetCurrentId}\label{wxthreadgetcurrentid}
+
+\func{static unsigned long}{GetCurrentId}{\void}
+
+Returns the platform specific thread ID of the current thread as a
+long.  This can be used to uniquely identify threads, even if they are
+not wxThreads.
+
+
 \membersection{wxThread::GetId}\label{wxthreadgetid}
 
 \constfunc{unsigned long}{GetId}{\void}
@@ -163,6 +180,7 @@ Returns the number of system CPUs or -1 if the value is unknown.
 Gets the thread identifier: this is a platform dependent number that uniquely identifies the
 thread throughout the system during its existence (i.e. the thread identifiers may be reused).
 
+
 \membersection{wxThread::GetPriority}\label{wxthreadgetpriority}
 
 \constfunc{int}{GetPriority}{\void}
@@ -178,35 +196,49 @@ The following priorities are defined:
 \twocolitem{{\bf WXTHREAD\_MAX\_PRIORITY}}{100}
 \end{twocollist}
 
+
 \membersection{wxThread::IsAlive}\label{wxthreadisalive}
 
 \constfunc{bool}{IsAlive}{\void}
 
-Returns TRUE if the thread is alive (i.e. started and not terminating).
+Returns \true if the thread is alive (i.e. started and not terminating).
+
+Note that this function can only safely be used with joinable threads, not
+detached ones as the latter delete themselves and so when the real thread is
+no longer alive, it is not possible to call this function because
+the wxThread object no longer exists.
 
 \membersection{wxThread::IsDetached}\label{wxthreadisdetached}
 
 \constfunc{bool}{IsDetached}{\void}
 
-Returns TRUE if the thread is of the detached kind, FALSE if it is a joinable one.
+Returns \true if the thread is of the detached kind, \false if it is a joinable
+one.
+
 
 \membersection{wxThread::IsMain}\label{wxthreadismain}
 
 \func{static bool}{IsMain}{\void}
 
-Returns TRUE if the calling thread is the main application thread.
+Returns \true if the calling thread is the main application thread.
+
 
 \membersection{wxThread::IsPaused}\label{wxthreadispaused}
 
 \constfunc{bool}{IsPaused}{\void}
 
-Returns TRUE if the thread is paused.
+Returns \true if the thread is paused.
+
 
 \membersection{wxThread::IsRunning}\label{wxthreadisrunning}
 
 \constfunc{bool}{IsRunning}{\void}
 
-Returns TRUE if the thread is running.
+Returns \true if the thread is running.
+
+This method may only be safely used for joinable threads, see the remark in 
+\helpref{IsAlive}{wxthreadisalive}.
+
 
 \membersection{wxThread::Kill}\label{wxthreadkill}
 
@@ -227,45 +259,51 @@ This function can only be called from another thread context, i.e. a thread
 cannot kill itself.
 
 It is also an error to call this function for a thread which is not running or
-paused (in the latter case, the thread will be resumed first) - if you do it, 
+paused (in the latter case, the thread will be resumed first) -- if you do it,
 a {\tt wxTHREAD\_NOT\_RUNNING} error will be returned.
 
+
 \membersection{wxThread::OnExit}\label{wxthreadonexit}
 
 \func{void}{OnExit}{\void}
 
 Called when the thread exits. This function is called in the context of the
 thread associated with the wxThread object, not in the context of the main
-thread. This function will not be called if the thread was 
+thread. This function will not be called if the thread was
 \helpref{killed}{wxthreadkill}.
 
 This function should never be called directly.
 
+
 \membersection{wxThread::Pause}\label{wxthreadpause}
 
 \func{wxThreadError}{Pause}{\void}
 
 Suspends the thread. Under some implementations (Win32), the thread is
-suspended immediately, under others it will only be suspended when it calls 
+suspended immediately, under others it will only be suspended when it calls
 \helpref{TestDestroy}{wxthreadtestdestroy} for the next time (hence, if the
 thread doesn't call it at all, it won't be suspended).
 
 This function can only be called from another thread context.
 
+
 \membersection{wxThread::Run}\label{wxthreadrun}
 
 \func{wxThreadError}{Run}{\void}
 
-Starts the thread execution. Should be called after 
+Starts the thread execution. Should be called after
 \helpref{Create}{wxthreadcreate}.
 
 This function can only be called from another thread context.
 
+
 \membersection{wxThread::SetPriority}\label{wxthreadsetpriority}
 
 \func{void}{SetPriority}{\param{int}{ priority}}
 
-Sets the priority of the thread, between zero and 100. This must be set before the thread is created.
+Sets the priority of the thread, between $0$ and $100$. It can only be set
+after calling \helpref{Create()}{wxthreadcreate} but before calling
+\helpref{Run()}{wxthreadrun}.
 
 The following priorities are already defined:
 
@@ -276,6 +314,7 @@ The following priorities are already defined:
 \twocolitem{{\bf WXTHREAD\_MAX\_PRIORITY}}{100}
 \end{twocollist}
 
+
 \membersection{wxThread::Sleep}\label{wxthreadsleep}
 
 \func{static void}{Sleep}{\param{unsigned long }{milliseconds}}
@@ -285,6 +324,7 @@ Pauses the thread execution for the given amount of time.
 This function should be used instead of \helpref{wxSleep}{wxsleep} by all worker
 threads (i.e. all except the main one).
 
+
 \membersection{wxThread::Resume}\label{wxthreadresume}
 
 \func{wxThreadError}{Resume}{\void}
@@ -293,6 +333,7 @@ Resumes a thread suspended by the call to \helpref{Pause}{wxthreadpause}.
 
 This function can only be called from another thread context.
 
+
 \membersection{wxThread::SetConcurrency}\label{wxthreadsetconcurrency}
 
 \func{static bool}{SetConcurrency}{\param{size\_t }{level}}
@@ -301,16 +342,22 @@ Sets the thread concurrency level for this process. This is, roughly, the
 number of threads that the system tries to schedule to run in parallel.
 The value of $0$ for {\it level} may be used to set the default one.
 
-Returns TRUE on success or FALSE otherwise (for example, if this function is
-not implemented for this platform - currently everything except Solaris).
+Returns \true on success or false otherwise (for example, if this function is
+not implemented for this platform -- currently everything except Solaris).
+
 
 \membersection{wxThread::TestDestroy}\label{wxthreadtestdestroy}
 
-\func{bool}{TestDestroy}{\void}
+\func{virtual bool}{TestDestroy}{\void}
 
 This function should be called periodically by the thread to ensure that calls
 to \helpref{Pause}{wxthreadpause} and \helpref{Delete}{wxthreaddelete} will
-work. If it returns TRUE, the thread should exit as soon as possible.
+work. If it returns \true, the thread should exit as soon as possible.
+
+Notice that under some platforms (POSIX), implementation of 
+\helpref{Pause}{wxthreadpause} also relies on this function being called, so
+not calling it would prevent both stopping and suspending thread from working.
+
 
 \membersection{wxThread::This}\label{wxthreadthis}
 
@@ -322,6 +369,7 @@ whether the thread is really the main one because NULL may also be returned for
 not created with wxThread class. Generally speaking, the return value for such a thread
 is undefined.
 
+
 \membersection{wxThread::Yield}\label{wxthreadyield}
 
 \func{void}{Yield}{\void}
@@ -329,6 +377,7 @@ is undefined.
 Give the rest of the thread time slice to the system allowing the other threads to run.
 See also \helpref{Sleep()}{wxthreadsleep}.
 
+
 \membersection{wxThread::Wait}\label{wxthreadwait}
 
 \constfunc{ExitCode}{Wait}{\void}
