X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9d6a9fdd13ab25f0ac7c54a3ec8098f8b5c1d118..5b5035ce5b432a4535a830debcb8ed26b7e1ec7b:/contrib/docs/latex/fl/body.tex?ds=sidebyside

diff --git a/contrib/docs/latex/fl/body.tex b/contrib/docs/latex/fl/body.tex
index 0d3cac65f1..a900fd7dda 100644
--- a/contrib/docs/latex/fl/body.tex
+++ b/contrib/docs/latex/fl/body.tex
@@ -30,7 +30,7 @@ is given as the moving bar displaces other bars.
 Other features: the splitter bar shows a dotted thick line as
 it's dragged. Single-clicking on a row handle minimizes it to
 a horizontal tab which is given its own narrow row. This allows
-the user to temporarily hide a row whilst allowing quick access
+the user to temporarily hide a row while allowing quick access
 to it when required.
 
 A close button (x) hides a bar completely. You can get it back again
