X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9d4e821b975100a03e53db1492c1243c45caa52f..048128e086f0eacc6e4cd1b16b966c641676a177:/docs/latex/wx/display.tex

diff --git a/docs/latex/wx/display.tex b/docs/latex/wx/display.tex
index b2c80bd300..87723079c6 100644
--- a/docs/latex/wx/display.tex
+++ b/docs/latex/wx/display.tex
@@ -19,7 +19,7 @@ None
 
 \membersection{wxDisplay::wxDisplay}\label{wxdisplayctor}
 
-\func{}{wxDisplay}{\param{size\_t }{index = 0}}
+\func{}{wxDisplay}{\param{unsigned }{index = 0}}
 
 Constructor, setting up a wxDisplay instance with the specified display.
 
@@ -57,9 +57,23 @@ function that changed the video mode to the system
 default by using the system's 'scrn' resource.
 
 
+\membersection{wxDisplay::GetClientArea}\label{wxdisplaygetclientarea}
+
+\constfunc{wxRect }{GetClientArea}{\void}
+
+Returns the client area of the display. The client area is the part of the
+display available for the normal (non full screen) windows, usually it is the
+same as \helpref{GetGeometry}{wxdisplaygetgeometry} but it could be less if
+there is a taskbar (or equivalent) on this display.
+
+\wxheading{See also:}
+
+\helpref{wxClientDisplayRect}{wxclientdisplayrect}
+
+
 \membersection{wxDisplay::GetCount}\label{wxdisplaygetcount}
 
-\func{static size\_t}{GetCount}{\void}
+\func{static unsigned }{GetCount}{\void}
 
 Returns the number of connected displays.
 
@@ -112,6 +126,10 @@ Returns \texttt{wxNOT\_FOUND} if the window is not on any connected display.
 Returns the bounding rectangle of the display whose index was passed to the
 constructor.
 
+\wxheading{See also:}
+
+\helpref{GetClientArea}{wxdisplaygetclientarea}, \helpref{wxDisplaySize}{wxdisplaysize}
+
 
 \membersection{wxDisplay::GetModes}\label{wxdisplaygetmodes}
 
