X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9d0e03774e3c1076e757490ad023c72eae867a6a..f07024ee6d5232d46780104fff14cfc67e34a4db:/docs/latex/wx/sysopt.tex

diff --git a/docs/latex/wx/sysopt.tex b/docs/latex/wx/sysopt.tex
index 91009e1a7c..7078bd6fa5 100644
--- a/docs/latex/wx/sysopt.tex
+++ b/docs/latex/wx/sysopt.tex
@@ -31,6 +31,11 @@ Setting this to 0 causes more flicker, but allows applications to paint graphics
 \twocolitem{msw.display.directdraw}{If set to 1, use DirectDraw-based implementation of
 \helpref{wxDisplay}{wxdisplay}. By default the standard Win32 functions are
 used.}
+\twocolitem{msw.font.no-proof-quality}{If set to 1, use default fonts quality
+instead of proof quality when creating fonts. With proof quality the fonts
+have slightly better appearance but not all fonts are available in this
+quality, e.g. the Terminal font in small sizes is not and this option may be
+used if wider fonts selection is more important than higher quality.}
 \end{twocollist}
 
 \wxheading{GTK}
