X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9c8849722a71ee7139e035bca5fdb2ae7b0af570..8a9c22462aec446d06267ac10b99f1115704b9d1:/docs/latex/wx/text.tex

diff --git a/docs/latex/wx/text.tex b/docs/latex/wx/text.tex
index a9bf9028d5..8d12aa2afa 100644
--- a/docs/latex/wx/text.tex
+++ b/docs/latex/wx/text.tex
@@ -319,7 +319,9 @@ consisting of the from and to values.}
 
 \constfunc{wxString}{GetValue}{\void}
 
-Gets the contents of the control.
+Gets the contents of the control. Notice that for a multiline text control,
+the lines will be separated by (Unix-style) '\\n' characters, even under
+Windows where they are separated by "\\r\\n" sequence in the native control.
 
 \membersection{wxTextCtrl::IsModified}\label{wxtextctrlismodified}
 
