X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9c824f2977a2e8a502b0570c5301caa2a547833a..3aa5d53272727835f297450e153ed79dc132e48a:/docs/latex/wx/stopwtch.tex?ds=inline

diff --git a/docs/latex/wx/stopwtch.tex b/docs/latex/wx/stopwtch.tex
index 98b60ed19f..cff119d2ca 100644
--- a/docs/latex/wx/stopwtch.tex
+++ b/docs/latex/wx/stopwtch.tex
@@ -1,6 +1,6 @@
 \section{\class{wxStopWatch}}\label{wxstopwatch}
 
-The wxStopWatch class allow you to measure time intervalls. 
+The wxStopWatch class allow you to measure time intervals.
 
 \wxheading{Include files}
 
