X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9c470b606a1cec5520bb974d18c81a3c8120a906..ba7fe276d4606f96352a468dbad872aa48932d8c:/docs/latex/wx/filedlg.tex

diff --git a/docs/latex/wx/filedlg.tex b/docs/latex/wx/filedlg.tex
index 6e95b41ec0..5f2b412dd6 100644
--- a/docs/latex/wx/filedlg.tex
+++ b/docs/latex/wx/filedlg.tex
@@ -164,7 +164,7 @@ Sets the default filename.
 
 \func{void}{SetFilterIndex}{\param{int }{filterIndex}}
 
-Sets the default filter index, starting from zero. Windows only.
+Sets the default filter index, starting from zero.
 
 \membersection{wxFileDialog::SetMessage}\label{wxfiledialogsetmessage}
 
