X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9bc8fded1b3e6e20da20c2471aead3d5761a6bcd..d2d93fdde48ef1dcbda52bad88fd39b7bd3a5458:/docs/latex/wx/htlnkinf.tex

diff --git a/docs/latex/wx/htlnkinf.tex b/docs/latex/wx/htlnkinf.tex
index 88ab0b1c83..20066909c9 100644
--- a/docs/latex/wx/htlnkinf.tex
+++ b/docs/latex/wx/htlnkinf.tex
@@ -51,5 +51,5 @@ Return {\it HREF} value of the {\tt <A>} tag.
 
 Return {\it TARGET} value of the {\tt <A>} tag (this value
 is used to specify in which frame should be the page pointed
-by {\helpref{Href}{wxhtmllinkinfogethref} opened).
+by \helpref{Href}{wxhtmllinkinfogethref} opened).
 
