X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9a75ba66de8f9dd3ebac0f41ec2e27be6d95aa73..e3408b704dd0e4dbd6e47cbb9dd90362e4957098:/docs/latex/wx/sysclevt.tex?ds=sidebyside

diff --git a/docs/latex/wx/sysclevt.tex b/docs/latex/wx/sysclevt.tex
index 6366459227..9019ac1005 100644
--- a/docs/latex/wx/sysclevt.tex
+++ b/docs/latex/wx/sysclevt.tex
@@ -13,6 +13,10 @@ This is only appropriate under Windows.
 
 <wx/event.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Event table macros}
 
 To process a system colour changed event, use this event handler macro to direct input to a member
