X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9a75ba66de8f9dd3ebac0f41ec2e27be6d95aa73..d1e1aa64cc309321bca5da477fdd6acc0194d96f:/docs/latex/wx/socket.tex?ds=sidebyside

diff --git a/docs/latex/wx/socket.tex b/docs/latex/wx/socket.tex
index f62335dd76..6d91017973 100644
--- a/docs/latex/wx/socket.tex
+++ b/docs/latex/wx/socket.tex
@@ -6,7 +6,7 @@
 %% Created:     1999
 %% RCS-ID:      $Id$
 %% Copyright:   (c) wxWidgets team
-%% License:     wxWidgets license
+%% License:     wxWindows license
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
 
 \section{\class{wxSocketBase}}\label{wxsocketbase}
@@ -560,8 +560,8 @@ The {\bf wxSOCKET\_REUSEADDR} flag controls the use of the SO\_REUSEADDR standar
 setsockopt() flag. This flag allows the socket to bind to a port that is already in use.
 This is mostly used on UNIX-based systems to allow rapid starting and stopping of a server - 
 otherwise you may have to wait several minutes for the port to become available.
-This option can have suprising platform dependent behavior, check the documentation for
-your platforms implementation of setsockopt().
+This option can have surprising platform dependent behavior, check the documentation for
+your platform's implementation of setsockopt().
 
 So:
 
