X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9a75ba66de8f9dd3ebac0f41ec2e27be6d95aa73..9c72cf7619064969b5c7f59cece74013789db4cf:/docs/latex/wx/stream.tex

diff --git a/docs/latex/wx/stream.tex b/docs/latex/wx/stream.tex
index a0bd5a64d1..45a146774a 100644
--- a/docs/latex/wx/stream.tex
+++ b/docs/latex/wx/stream.tex
@@ -95,8 +95,8 @@ It returns the size of the data read. If the returned size is different of the s
 
 \func{size\_t}{Read}{\param{wxStreamBuffer *}{buffer}}
 
-Reads a {\it buffer}. The function returns when {\it buffer} is full or when there isn't
-data anymore in the current buffer.
+Copies data to {\it buffer}. The function returns when {\it buffer} is full or when there isn't
+any more data in the current buffer.
 
 \wxheading{See also}
 
