X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9a75ba66de8f9dd3ebac0f41ec2e27be6d95aa73..96461cc29d03b4a7ab72abaae2e7edace93dd2a5:/docs/latex/wx/splitter.tex

diff --git a/docs/latex/wx/splitter.tex b/docs/latex/wx/splitter.tex
index bae4740e5d..3c09fc7a71 100644
--- a/docs/latex/wx/splitter.tex
+++ b/docs/latex/wx/splitter.tex
@@ -331,6 +331,15 @@ Does not currently check for an out-of-range value.
 
 \helpref{wxSplitterWindow::GetSashPosition}{wxsplitterwindowgetsashposition}
 
+\membersection{wxSplitterWindow::SetSashSize}\label{wxsplitterwindowsetsashsize}
+
+\func{void}{SetSashSize}{\param{int }{size}}
+
+Sets the sash size. Normally, the sash size is determined according to the metrics
+of each platform, but the application can override this, for example to show
+a thin sash that the user is not expected to drag. If {\it size} is more -1,
+the custom sash size will be used.
+
 \membersection{wxSplitterWindow::SetMinimumPaneSize}\label{wxsplitterwindowsetminimumpanesize}
 
 \func{void}{SetMinimumPaneSize}{\param{int }{paneSize}}
