X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9a75ba66de8f9dd3ebac0f41ec2e27be6d95aa73..5c35d5c1d984f46d33e8181c907936e96160d795:/docs/latex/wx/print.tex

diff --git a/docs/latex/wx/print.tex b/docs/latex/wx/print.tex
index de8c3d6614..34dadf664c 100644
--- a/docs/latex/wx/print.tex
+++ b/docs/latex/wx/print.tex
@@ -155,9 +155,9 @@ On input you should pass one of these identifiers, but on return you may get bac
 indicating the current resolution setting.
 
 
-\membersection{wxPrintData::Ok}\label{wxprintdataok}
+\membersection{wxPrintData::IsOk}\label{wxprintdataisok}
 
-\constfunc{bool}{Ok}{\void}
+\constfunc{bool}{IsOk}{\void}
 
 Returns true if the print data is valid for using in print dialogs.
 This can return false on Windows if the current printer is not set, for example.
@@ -562,9 +562,9 @@ a concept specific to the application).
 Returns the {\it to} page number, as entered by the user.
 
 
-\membersection{wxPrintDialogData::Ok}\label{wxprintdialogdataok}
+\membersection{wxPrintDialogData::IsOk}\label{wxprintdialogdataisok}
 
-\constfunc{bool}{Ok}{\void}
+\constfunc{bool}{IsOk}{\void}
 
 Returns true if the print data is valid for using in print dialogs.
 This can return false on Windows if the current printer is not set, for example.
@@ -635,9 +635,7 @@ implements this command, if at all.
 Determines whether the dialog to be shown will be the Print dialog
 (pass false) or Print Setup dialog (pass true).
 
-Note that the setup dialog is (according to Microsoft) obsolete from
-Windows 95, though retained for backward compatibility.
-
+This function has been deprecated since version 2.5.4.
 
 \membersection{wxPrintDialogData::SetToPage}\label{wxprintdialogdatasettopage}
 
@@ -804,7 +802,10 @@ achieving the correct scaling for the page.
 
 Pass a \helpref{wxPrintData}{wxprintdata} object with information
 necessary for setting up a suitable printer device context. This
-is the recommended way to construct a wxPrinterDC.
+is the recommended way to construct a wxPrinterDC.  Make sure you 
+specify a reference to a \helpref{wxPrintData}{wxprintdata} object,
+not a pointer - you may not even get a warning if you pass a pointer
+instead.
 
 \func{}{wxPrinterDC}{\param{const wxString\& }{driver}, \param{const wxString\& }{device}, \param{const wxString\& }{output},
  \param{const bool }{interactive = true}, \param{int }{orientation = wxPORTRAIT}}
@@ -1134,7 +1135,7 @@ Gets the printout object to be used for printing from within the preview interfa
 or NULL if none exists.
 
 
-\membersection{wxPrintPreview::Ok}\label{wxprintpreviewok}
+\membersection{wxPrintPreview::IsOk}\label{wxprintpreviewisok}
 
 \func{bool}{Ok}{\void}
 
