X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9a75ba66de8f9dd3ebac0f41ec2e27be6d95aa73..4fbbe847c8733bb6509c853e451c54c940917a7a:/docs/latex/wx/splitter.tex

diff --git a/docs/latex/wx/splitter.tex b/docs/latex/wx/splitter.tex
index bae4740e5d..6f18e23181 100644
--- a/docs/latex/wx/splitter.tex
+++ b/docs/latex/wx/splitter.tex
@@ -297,12 +297,12 @@ Gravity tells wxSplitterWindow how much will left/top window grow while resizing
 
 Example values:
 \begin{itemize}\itemsep=0pt
-\item{ 0.0  - only the bottom/right window is automaticaly resized}
+\item{ 0.0  - only the bottom/right window is automatically resized}
 \item{ 0.5  - both windows grow by equal size}
 \item{ 1.0  - only left/top window grows}
 \end{itemize}
 
-Gravity should be real value betwwen 0.0 and 1.0.
+Gravity should be a real value between 0.0 and 1.0.
 
 Default value of sash gravity is 0.0. That value is compatible with previous 
 (before gravity was introduced) behaviour of wxSplitterWindow.
@@ -331,6 +331,15 @@ Does not currently check for an out-of-range value.
 
 \helpref{wxSplitterWindow::GetSashPosition}{wxsplitterwindowgetsashposition}
 
+\membersection{wxSplitterWindow::SetSashSize}\label{wxsplitterwindowsetsashsize}
+
+\func{void}{SetSashSize}{\param{int }{size}}
+
+Sets the sash size. Normally, the sash size is determined according to the metrics
+of each platform, but the application can override this, for example to show
+a thin sash that the user is not expected to drag. If {\it size} is more -1,
+the custom sash size will be used.
+
 \membersection{wxSplitterWindow::SetMinimumPaneSize}\label{wxsplitterwindowsetminimumpanesize}
 
 \func{void}{SetMinimumPaneSize}{\param{int }{paneSize}}
@@ -387,7 +396,7 @@ child windows are shown if they are currently hidden.
 \docparam{window2}{The bottom pane.}
 
 \docparam{sashPosition}{The initial position of the sash. If this value is
-positive, it specifies the size of the upper pane. If it is negative, it is
+positive, it specifies the size of the upper pane. If it is negative, its
 absolute value gives the size of the lower pane. Finally, specify 0 (default)
 to choose the default position (half of the total window height).}
 
