X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9a75ba66de8f9dd3ebac0f41ec2e27be6d95aa73..2209baaee3a8578450e204593b79ed155f340f68:/docs/latex/wx/print.tex

diff --git a/docs/latex/wx/print.tex b/docs/latex/wx/print.tex
index de8c3d6614..cc02e3158d 100644
--- a/docs/latex/wx/print.tex
+++ b/docs/latex/wx/print.tex
@@ -635,9 +635,7 @@ implements this command, if at all.
 Determines whether the dialog to be shown will be the Print dialog
 (pass false) or Print Setup dialog (pass true).
 
-Note that the setup dialog is (according to Microsoft) obsolete from
-Windows 95, though retained for backward compatibility.
-
+This function has been deprecated since version 2.5.4.
 
 \membersection{wxPrintDialogData::SetToPage}\label{wxprintdialogdatasettopage}
 
@@ -804,7 +802,10 @@ achieving the correct scaling for the page.
 
 Pass a \helpref{wxPrintData}{wxprintdata} object with information
 necessary for setting up a suitable printer device context. This
-is the recommended way to construct a wxPrinterDC.
+is the recommended way to construct a wxPrinterDC.  Make sure you 
+specify a reference to a \helpref{wxPrintData}{wxprintdata} object,
+not a pointer - you may not even get a warning if you pass a pointer
+instead.
 
 \func{}{wxPrinterDC}{\param{const wxString\& }{driver}, \param{const wxString\& }{device}, \param{const wxString\& }{output},
  \param{const bool }{interactive = true}, \param{int }{orientation = wxPORTRAIT}}
