X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9a75ba66de8f9dd3ebac0f41ec2e27be6d95aa73..0597e7f977c87d107e24bf3e95ebfa3d60efc249:/docs/latex/wx/stream.tex

diff --git a/docs/latex/wx/stream.tex b/docs/latex/wx/stream.tex
index a0bd5a64d1..9ff128a6ed 100644
--- a/docs/latex/wx/stream.tex
+++ b/docs/latex/wx/stream.tex
@@ -95,8 +95,8 @@ It returns the size of the data read. If the returned size is different of the s
 
 \func{size\_t}{Read}{\param{wxStreamBuffer *}{buffer}}
 
-Reads a {\it buffer}. The function returns when {\it buffer} is full or when there isn't
-data anymore in the current buffer.
+Copies data to {\it buffer}. The function returns when {\it buffer} is full or when there isn't
+any more data in the current buffer.
 
 \wxheading{See also}
 
@@ -296,6 +296,12 @@ Flushes the IO buffer.
 
 Fill the IO buffer.
 
+\membersection{wxStreamBuffer::GetBufferSize}\label{wxstreambuffergetbuffersize}
+
+\constfunc{size\_t}{GetBufferSize}{\void}
+
+Returns the size of the buffer.
+
 \membersection{wxStreamBuffer::GetDataLeft}\label{wxstreambuffergetdataleft}
 
 \func{size\_t}{GetDataLeft}{\void}
