X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9a1e758d899e1945ea56c4bc431a5591e8ad31cd..efe0d228f70138581f5b8e5789f999c7af6434a3:/docs/latex/wx/htmllbox.tex?ds=inline

diff --git a/docs/latex/wx/htmllbox.tex b/docs/latex/wx/htmllbox.tex
index e56d1b6d1a..257611d039 100644
--- a/docs/latex/wx/htmllbox.tex
+++ b/docs/latex/wx/htmllbox.tex
@@ -127,3 +127,18 @@ for the given item.
 This function may be overridden to decorate HTML returned by
 \helpref{OnGetItem()}{wxhtmllistboxongetitem}.
 
+\membersection{wxHtmlListBox::OnLinkClicked}\label{wxhtmlistboxonlinkclicked}
+
+\func{virtual void}{OnLinkClicked}{\param{size\_t }{n}, \param{const wxHtmlLinkInfo\& }{link}}
+
+Called when the user clicks on hypertext link. Does nothing by default.
+
+\wxheading{Parameters}
+
+\docparam{n}{Index of the item containing the link.}
+
+\docparam{link}{Description of the link.}
+
+\wxheading{See also}
+
+See also \helpref{wxHtmlLinkInfo}{wxhtmllinkinfo}.
