X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/99646f7ee4afb3d7d929e1d396e56de8c1aed622..85d8df29aa7c2de9ea92d13adeff46d5ed854d58:/docs/latex/wx/timer.tex?ds=sidebyside

diff --git a/docs/latex/wx/timer.tex b/docs/latex/wx/timer.tex
index 97939eb2ba..21edad6b88 100644
--- a/docs/latex/wx/timer.tex
+++ b/docs/latex/wx/timer.tex
@@ -11,18 +11,24 @@ There are two different ways to use this class:
 \helpref{Notify}{wxtimernotify} member to perform the required action.
 \item Or you may redirect the notifications to any 
 \helpref{wxEvtHandler}{wxevthandler} derived object by using the non default
-constructor or \helpref{SetOwner}{wxtimersetowner}. Then use {\tt EVT\_TIMER} 
+constructor or \helpref{SetOwner}{wxtimersetowner}. Then use the {\tt EVT\_TIMER} 
 macro to connect it to the event handler which will receive 
 \helpref{wxTimerEvent}{wxtimerevent} notifications.
+\item Or you may use a derived class and the {\tt EVT\_TIMER} 
+macro to connect it to an event handler defined in the derived class.
+If the default constructor is used, the timer object will be its
+own owner object, since it is derived from wxEvtHandler.
 \end{enumerate}
 
 In any case, you must start the timer with \helpref{Start}{wxtimerstart} 
 after constructing it before it actually starts sending notifications. It can
 be stopped later with \helpref{Stop}{wxtimerstop}.
 
+{\bf NB:} note that timer can only be used from the main thread currently.
+
 \wxheading{Derived from}
 
-\helpref{wxObject}{wxobject}
+\helpref{wxEvtHandler}{wxevthandler}
 
 \wxheading{Include files}
 
@@ -47,13 +53,13 @@ Default constructor. If you use it to construct the object and don't call
 Creates a timer and associates it with {\it owner}. Please see 
 \helpref{SetOwner}{wxtimersetowner} for the description of parameters.
 
-\membersection{wxTimer::\destruct{wxTimer}}
+\membersection{wxTimer::\destruct{wxTimer}}\label{wxtimerdtor}
 
 \func{}{\destruct{wxTimer}}{\void}
 
 Destructor. Stops the timer if it is running.
 
-\membersection{wxTimer::GetInterval}{wxtimergetinterval}
+\membersection{wxTimer::GetInterval}\label{wxtimergetinterval}
 
 \constfunc{int}{GetInterval}{\void}
 
@@ -63,14 +69,14 @@ Returns the current interval for the timer (in milliseconds).
 
 \constfunc{bool}{IsOneShot}{\void}
 
-Returns TRUE if the timer is one shot, i.e. if it will stop after firing the
+Returns {\tt true} if the timer is one shot, i.e.\ if it will stop after firing the
 first notification automatically.
 
 \membersection{wxTimer::IsRunning}\label{wxtimerisrunning}
 
 \constfunc{bool}{IsRunning}{\void}
 
-Returns TRUE if the timer is running, FALSE if it is stopped.
+Returns {\tt true} if the timer is running, {\tt false} if it is stopped.
 
 \membersection{wxTimer::Notify}\label{wxtimernotify}
 
@@ -85,21 +91,28 @@ Perform whatever action which is to be taken periodically here.
 
 \func{void}{SetOwner}{\param{wxEvtHandler *}{owner}, \param{int }{id = -1}}
 
-Associates the timer with the given {\it owner} object. When the timer is
+Associates the timer with the given {\it owner}\/ object. When the timer is
 running, the owner will receive \helpref{timer events}{wxtimerevent} with
-id equal to {\it id} specified here.
+id equal to {\it id}\/ specified here.
 
 \membersection{wxTimer::Start}\label{wxtimerstart}
 
-\func{bool}{Start}{\param{int}{ milliseconds = -1}, \param{bool}{ oneShot=FALSE}}
+\func{bool}{Start}{\param{int}{milliseconds = -1}, \param{bool }{oneShot = {\tt false}}}
+
+(Re)starts the timer. If {\it milliseconds}\/ parameter is -1 (value by default),
+the previous value is used. Returns {\tt false} if the timer could not be started,
+{\tt true} otherwise (in MS Windows timers are a limited resource).
 
-(Re)starts the timer. If {\it milliseconds} parameter is -1 (value by default),
-the previous value is used. Returns FALSE if the timer could not be started,
-TRUE otherwise (in MS Windows timers are a limited resource).
+If {\it oneShot}\/ is {\tt false} (the default), the \helpref{Notify}{wxtimernotify} 
+function will be called repeatedly until the timer is stopped. If {\tt true},
+it will be called only once and the timer will stop automatically. To make your
+code more readable you may also use the following symbolic constants:
 
-If {\it oneShot} is FALSE (the default), the \helpref{Notify}{wxtimernotify} 
-function will be called repeatedly until the timer is stopped. If TRUE,
-it will be called only once and the timer will stop automatically.
+\twocolwidtha{5cm}
+\begin{twocollist}\itemsep=0pt
+\twocolitem{wxTIMER\_CONTINUOUS}{Start a normal, continuously running, timer}
+\twocolitem{wxTIMER\_ONE\_SHOT}{Start a one shot timer}
+\end{twocollist}
 
 If the timer was already running, it will be stopped by this method before
 restarting it.
