X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/986ecc861c52842f25151543587000176cc5244d..14f8fa9d7fa07b02c276981d135ce73cf6818879:/docs/latex/wx/function.tex

diff --git a/docs/latex/wx/function.tex b/docs/latex/wx/function.tex
index d36cd706ec..2a31f788cd 100644
--- a/docs/latex/wx/function.tex
+++ b/docs/latex/wx/function.tex
@@ -1734,7 +1734,8 @@ The symbols are not shown when the generic function is used.
  \param{wxTipProvider *}{tipProvider},
  \param{bool }{showAtStartup = TRUE}}
 
-This function shows a "startup tip" to the user.
+This function shows a "startup tip" to the user. The return value is the
+state of the ``Show tips at startup'' checkbox.
 
 \docparam{parent}{The parent window for the modal dialog}
 
