X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9869734d0431a29732006119f2d4ed35af70ca9b..f3d4cc30e9bd2d06453388d91d64e295fce33caa:/docs/latex/wx/config.tex

diff --git a/docs/latex/wx/config.tex b/docs/latex/wx/config.tex
index 30a6a6aeab..8275f459be 100644
--- a/docs/latex/wx/config.tex
+++ b/docs/latex/wx/config.tex
@@ -358,7 +358,9 @@ class and is ignored by some. For wxFileConfig, these styles determine whether
 a local or global config file is created or used. If the flag is present but
 the parameter is empty, the parameter will be set to a default. If the
 parameter is present but the style flag not, the relevant flag will be added
-to the style.}
+to the style. For wxFileConfig you can also add wxCONFIG\_USE\_RELATIVE\_PATH 
+by logicaly or'ing it to either of the _FILE options to tell wxFileConfig to 
+use relative instead of absolute paths.  }
 
 \wxheading{Remarks}
 
@@ -443,7 +445,7 @@ Returns the type of the given entry or {\it Unknown} if the entry doesn't
 exist. This function should be used to decide which version of Read() should
 be used because some of wxConfig implementations will complain about type
 mismatch otherwise: e.g., an attempt to read a string value from an integer
-key with \helpref{wxRegConfig}{wxregconfig} will fail.
+key with wxRegConfig will fail.
 
 The result is an element of enum EntryType:
 
