X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9804d5404a9607cda3d08ec8225f52f78b78bc72..6e65f80be5dfcc75bd520fc320d3389e4559bccf:/docs/latex/wx/notebook.tex

diff --git a/docs/latex/wx/notebook.tex b/docs/latex/wx/notebook.tex
index 5b38276454..3a714b6f18 100644
--- a/docs/latex/wx/notebook.tex
+++ b/docs/latex/wx/notebook.tex
@@ -404,8 +404,21 @@ Sets the selection for the given page, returning the previous selection.
 
 The call to this function generates the page changing events.
 
+This function is deprecated and should not be used in new code. Please use the
+\helpref{ChangeSelection}{wxnotebookchangeselection} function instead.
+
 \wxheading{See also}
 
 \helpref{wxNotebook::GetSelection}{wxnotebookgetselection}
 
 
+\membersection{wxNotebook::ChangeSelection}\label{wxnotebookchangeselection}
+
+\func{int}{ChangeSelection}{\param{size\_t}{ page}}
+
+Changes the selection for the given page, returning the previous selection.
+
+The call to this function \emph{does not} generate the page changing events.
+This is the only difference with \helpref{SetSelection}{wxnotebooksetselection}.
+See \helpref{this topic}{progevent} for more info.
+
