X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/97e1d37c96655119ea25c3a099f3189885864c0c..12ac619f42b81420980aec14afc9433af6f911dc:/docs/latex/wx/evthand.tex?ds=sidebyside

diff --git a/docs/latex/wx/evthand.tex b/docs/latex/wx/evthand.tex
index e891d4f826..ab602afed6 100644
--- a/docs/latex/wx/evthand.tex
+++ b/docs/latex/wx/evthand.tex
@@ -102,6 +102,10 @@ is an alternative to the use of static event tables. See the 'dynamic' sample fo
     (wxObjectEventFunction) (wxEventFunction) (wxCommandEventFunction) MyFrame::OnQuit );
 \end{verbatim}
 
+\perlnote{In wxPerl this function takes 4 arguments: \texttt{id,
+lastid, type, method}; if \texttt{method} is \texttt{undef}, the
+handler is disconnected.}
+
 \membersection{wxEvtHandler::Disconnect}\label{wxevthandlerdisconnect}
 
 \func{bool}{Disconnect}{\param{int}{ id},
@@ -132,6 +136,9 @@ to disconnect functions connected using the (static) event tables.
 
 \docparam{eventSink}{Object whose member function should be called.}
 
+\perlnote{In wxPerl this function takes 3 arguments: \texttt{id,
+lastid, type}.}
+
 \membersection{wxEvtHandler::GetClientData}\label{wxevthandlergetclientdata}
 
 \func{void* }{GetClientData}{\void}
