X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9722642d5d29a39c9b7ab3d0a07e773ea0c8829a..4d7b7fc21217722b407320c5d599e3d316c72996:/docs/latex/wx/grid.tex

diff --git a/docs/latex/wx/grid.tex b/docs/latex/wx/grid.tex
index 1ffe177d10..ef18fc067e 100644
--- a/docs/latex/wx/grid.tex
+++ b/docs/latex/wx/grid.tex
@@ -478,7 +478,7 @@ Returns the current height of the column labels.
 
 \func{wxString}{GetColLabelValue}{\param{int }{col}}
 
-Returns the specifed column label. The default grid table class provides column labels of
+Returns the specified column label. The default grid table class provides column labels of
 the form A,B...Z,AA,AB...ZZ,AAA... If you are using a custom grid table you can override 
 \helpref{wxGridTableBase::GetColLabelValue}{wxgridtablebasegetcollabelvalue} to provide
 your own labels. 
@@ -581,7 +581,7 @@ Returns the colour used for grid lines.
 
 \func{bool}{GridLinesEnabled}{\void}
 
-Returnes TRUE if drawing of grid lines is turned on, FALSE otherwise.
+Returns TRUE if drawing of grid lines is turned on, FALSE otherwise.
 
 \membersection{wxGrid::GetLabelBackgroundColour}\label{wxgridgetlabelbackgroundcolour}
 
@@ -636,7 +636,7 @@ Returns the current width of the row labels.
 
 \func{wxString}{GetRowLabelValue}{\param{int }{row}}
 
-Returns the specifed row label. The default grid table class provides numeric row labels.
+Returns the specified row label. The default grid table class provides numeric row labels.
 If you are using a custom grid table you can override 
 \helpref{wxGridTableBase::GetRowLabelValue}{wxgridtablebasegetcollabelvalue} to provide
 your own labels. 
@@ -897,7 +897,7 @@ deselected; if TRUE the row will be added to the existing selection.
 
 \func{void}{SetCellAlignment}{\param{int }{align}}
 
-Sets the horizontal and vertial alignment for grid cell text at the specified location.
+Sets the horizontal and vertical alignment for grid cell text at the specified location.
 
 Horizontal alignment should be one of wxALIGN\_LEFT, wxALIGN\_CENTRE or wxALIGN\_RIGHT. \\
 Vertical alignment should be one of wxALIGN\_TOP, wxALIGN\_CENTRE or wxALIGN\_BOTTOM.
@@ -1046,7 +1046,7 @@ The memory requirements for this could become prohibitive if your grid is very l
 
 \func{void}{SetDefaultCellAlignment}{\param{int }{horiz}, \param{int }{vert}}
 
-Sets the default horizontal and vertial alignment for grid cell text.
+Sets the default horizontal and vertical alignment for grid cell text.
 
 Horizontal alignment should be one of wxALIGN\_LEFT, wxALIGN\_CENTRE or wxALIGN\_RIGHT.
 
