X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9722642d5d29a39c9b7ab3d0a07e773ea0c8829a..156194e1d525407e90c21552f8f7aa05756e0ddc:/docs/latex/wx/procevt.tex

diff --git a/docs/latex/wx/procevt.tex b/docs/latex/wx/procevt.tex
index fd88a750cb..dc70b66fdd 100644
--- a/docs/latex/wx/procevt.tex
+++ b/docs/latex/wx/procevt.tex
@@ -54,3 +54,4 @@ Returns the process id.
 \func{int}{GetExitCode}{\void}
 
 Returns the exist status.
+
