X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9704b2509ac4fd7b9fccd5299e0b377accb2b59e..f811bc9ac07404a8e90570b243918d11289ef1e2:/docs/latex/wx/htdcrend.tex

diff --git a/docs/latex/wx/htdcrend.tex b/docs/latex/wx/htdcrend.tex
index 4897caba25..2ecfad889a 100644
--- a/docs/latex/wx/htdcrend.tex
+++ b/docs/latex/wx/htdcrend.tex
@@ -37,7 +37,7 @@ inch wide on typical printer. With pixel\_scale = 3.0 it would be 3 inches.)
 
 \wxheading{Parameters}
 
-\docparam{maxwidth}{width of the area (on this DC) that is equivalent to screen's width, 
+\docparam{maxwidth}{width of the area (on this DC) that is equivalent to the screen's width, 
 in pixels (you should set it to page width minus margins). 
 
 {\bf Note:} In the current implementation
