X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9704b2509ac4fd7b9fccd5299e0b377accb2b59e..3b415ba4cdee694574d7235ff0b8341f105cddfe:/docs/latex/wx/hthlpfrm.tex

diff --git a/docs/latex/wx/hthlpfrm.tex b/docs/latex/wx/hthlpfrm.tex
index 413f6fae97..d255a73df8 100644
--- a/docs/latex/wx/hthlpfrm.tex
+++ b/docs/latex/wx/hthlpfrm.tex
@@ -5,7 +5,7 @@
 
 \section{\class{wxHtmlHelpFrame}}\label{wxhtmlhelpframe}
 
-This class is used by \helpref{wxHtmlHelpController}{wxhtmlhelpcontroller}
+This class is used by \helpref{wxHtmlHelpController}{wxhtmlhelpcontroller} 
 to display help.
 It is an internal class and should not be used directly - except for the case
 when you're writing your own HTML help controller.
@@ -18,7 +18,6 @@ when you're writing your own HTML help controller.
 
 <wx/html/helpfrm.h>
 
-
 \latexignore{\rtfignore{\wxheading{Members}}}
 
 \membersection{wxHtmlHelpFrame::wxHtmlHelpFrame}\label{wxhtmlhelpframewxhtmlhelpframe}
@@ -131,14 +130,14 @@ Reads user's settings for this frame (see \helpref{wxHtmlHelpController::ReadCus
 
 \func{void}{RefreshLists}{\param{bool }{show\_progress = FALSE}}
 
-Refresh all panels. This is necessary if new book was added.
+Refresh all panels. This is necessary if a new book was added.
 
 \membersection{wxHtmlHelpFrame::SetTitleFormat}\label{wxhtmlhelpframesettitleformat}
 
 \func{void}{SetTitleFormat}{\param{const wxString\& }{format}}
 
-Sets frame's title format. {\it format} must contain exactly one "\%s"
-(it will be replaced by page's title).
+Sets the frame's title format. {\it format} must contain exactly one "\%s"
+(it will be replaced by the page title).
 
 \membersection{wxHtmlHelpFrame::UseConfig}\label{wxhtmlhelpframeuseconfig}
 
