X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/9704b2509ac4fd7b9fccd5299e0b377accb2b59e..2562c82329113d43b0de122c86ac23f0dca0e669:/docs/latex/wx/htwidget.tex

diff --git a/docs/latex/wx/htwidget.tex b/docs/latex/wx/htwidget.tex
index f9b765a6db..21f3ea8094 100644
--- a/docs/latex/wx/htwidget.tex
+++ b/docs/latex/wx/htwidget.tex
@@ -28,7 +28,7 @@ Constructor.
 
 \wxheading{Parameters}
 
-\docparam{wnd}{Connected window. It's parent window {\bf must} be the wxHtmlWindow object within
+\docparam{wnd}{Connected window. It is parent window {\bf must} be the wxHtmlWindow object within
 which it is displayed!}
 
 \docparam{w}{Floating width. If non-zero width of {\it wnd} window is adjusted so that it is
