X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/965b4f87d9d59c7c6d58da6567dca176d9131296..401e3b6e5f50f15571b86297b5d1e3f55c473f6f:/docs/latex/wx/panel.tex

diff --git a/docs/latex/wx/panel.tex b/docs/latex/wx/panel.tex
index 1f41e2b6fe..1b8f49e5cb 100644
--- a/docs/latex/wx/panel.tex
+++ b/docs/latex/wx/panel.tex
@@ -56,10 +56,10 @@ Constructor.
 \docparam{id}{An identifier for the panel. A value of -1 is taken to mean a default.}
 
 \docparam{pos}{The panel position. A value of (-1, -1) indicates a default position, chosen by
-either the windowing system or wxWindows, depending on platform.}
+either the windowing system or wxWidgets, depending on platform.}
 
 \docparam{size}{The panel size. A value of (-1, -1) indicates a default size, chosen by
-either the windowing system or wxWindows, depending on platform.}
+either the windowing system or wxWidgets, depending on platform.}
 
 \docparam{style}{The window style. See \helpref{wxPanel}{wxpanel}.}
 
