X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/96461cc29d03b4a7ab72abaae2e7edace93dd2a5..ddca12cfd9c965963eb63751252000d03a12d9da:/docs/latex/wx/strmmem.tex

diff --git a/docs/latex/wx/strmmem.tex b/docs/latex/wx/strmmem.tex
index c3f3866aea..64f28a1e5f 100644
--- a/docs/latex/wx/strmmem.tex
+++ b/docs/latex/wx/strmmem.tex
@@ -26,11 +26,11 @@
 
 Initializes a new read-only memory stream which will use the specified buffer
 {\it data} of length {\it len}. The stream does not take ownership of the 
-buffer, i.e. that it will not delete in its destructor.
+buffer, i.e. the buffer will not be deleted in its destructor.
 
 \func{}{wxMemoryInputStream}{\param{const wxMemoryOutputStream&}{ stream}}
 
-Creates a new read-only memory stream, initilalizing it with the
+Creates a new read-only memory stream, initializing it with the
 data from the given output stream \arg{stream}.
 
 \membersection{wxMemoryInputStream::\destruct{wxMemoryInputStream}}\label{wxmemoryinputstreamdtor}
@@ -105,3 +105,4 @@ len or the size of the stream buffer.
 
 Returns the pointer to the stream object used as an internal buffer
 for that stream.
+
